Masjid ʿAlī - مسجد علي
edition published: 2020-01-10-06:00
language: en
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

Masjid ʿAlī; مسجد علي
A mosque in Medina.
location: 24.4607882 39.6089998
identifier: https://bqgazetteer.bethmardutho.org/place/5380
identifier: http://syriaca.org/place/5380
identifier: https://goo.gl/maps/ExBqUEKcwmuNJALn6
Riḥlat Ibn Jubayr Ibn Jubayr M.J. de Goeje 198
https://goo.gl/maps/ExBqUEKcwmuNJALn6 Google Maps Andrew Lookingbill Ethan Russell