Masjid Rasūl Allāh - مسجد رسول الله
edition published: 2020-01-10-06:00
language: en
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

Masjid Rasūl Allāh; مسجد رسول الله; al-Masjid al-Nabawī; al-Ḥaram al-Nabawī; Masjid al-Nabī; المسجد النبوي; الحرم النبوي; مسجد النبي
One of the largest mosques in the world located in Mecca.
location: 24.4672154 39.608937
identifier: https://bqgazetteer.bethmardutho.org/place/5378
identifier: http://syriaca.org/place/5378
identifier: https://goo.gl/maps/KbqjQPqwZaXqYncA6
Riḥlat Ibn Jubayr Ibn Jubayr M.J. de Goeje 190-195
https://goo.gl/maps/KbqjQPqwZaXqYncA6 Google Maps Andrew Lookingbill Ethan Russell