Masjid Dhī al-Ḥulayfa - مسجد ذي الحليفة
edition published: 2020-01-10-06:00
language: en
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

Masjid Dhī al-Ḥulayfa; مسجد ذي الحليفة
A mosque southwest of Medina.
location: 24.4137332 39.4729558
identifier: https://bqgazetteer.bethmardutho.org/place/5376
identifier: http://syriaca.org/place/5376
identifier: https://goo.gl/maps/co5nawxiDKoi7C5H8
Riḥlat Ibn Jubayr Ibn Jubayr M.J. de Goeje 189
https://goo.gl/maps/co5nawxiDKoi7C5H8 Google Maps Andrew Lookingbill Ethan Russell